System-dependent source for MS-DOS Kermit Grid Compass support in
MSUGRI.ASM, MSGGRI.ASM, and MSXGRI.ASM.  For now, must be built from
source.  MSGGRI.BAT will assemble and line the modules. Output is
MSTGRI.EXE.  MSVGRI.LNK will link the modules. Output is MSTGRI.EXE.
 
            Features of Kermit 3.00 for the GRiD Compass
 
Tektronix emulation is now supported. As with the IBM version, the Tek
emulator is automatically entered with ESC ^L or ESC [?38h. Automatic
exit is with ESC [?38l or ^X. "DISABLE TEK" will disable automatic
entry/exit.  Tektronix emulation is functionally very similar to that
done for IBM. The principal difference is that characters from the
bottom of the screen are rolled around to the top for the GRiD whereas
for the IBM version, the user is required to press a key in response
to a "More" message when the bottom of the screen is reached.
 
The arrow keys are used to move the graphics cursor. CODE-arrow is for
faster cursor movement.
 
CODE-MINUS will toggle between Tektronix and built-in ansi terminal
emulation in connect mode. Graphics and alpha screens are saved.
CODE-= clears the screen in connect mode.
 
Character are now written to the screen through the BIOS rather than
through MSDOS. The keyboard is read once each eight reads of the
serial port. These changes have approximately doubled the speed in
connect mode to an effective baud rate of about 4800.
 
Xoff/Xon flow control now works. No characters are lost at 19200 baud.
(Flow control is probably not needed when using the modem.)
 
By specifying "SET TERM 112x" or "SET TERM 113x", the user tells
kermit the size of his screen. This is essential for Tektronix
emulation. (112x is the default.)
 
The hangup and send break commands now work.
 
Note: The default escape character ^[ maps into CNTRL-= (control and =
pressed simultaneously) on the GRiD keyboard.
 
               Kermit on the GRiD Compass II and UNIX.
 
Tell stty your screen dimensions with
stty rows 26
stty columns 80
The termcap below works well.
 
 
sx|ansi|ansi termcap modified for GRid Compass II:\
        :co#80:li#26:cl=50\E[;H\E[2J:bs:am:cm=\E[%i%d;%dH:\
        :do=^J:nd=\E[C:up=\E[A:ce=\E[K:ho=\E[H:pt:\
        :al=\E[1L:dl=\E[1M:\
        :ku=\EA:kd=\EB:kl=\ED:kr=\EC:kh=\Eh:\
        :so=\E[7m:se=\E[0m:
